Index: openacs-4/packages/cms/sql/postgresql/cms-workflow.sql
===================================================================
RCS file: /usr/local/cvsroot/openacs-4/packages/cms/sql/postgresql/cms-workflow.sql,v
diff -u -r1.5 -r1.6
--- openacs-4/packages/cms/sql/postgresql/cms-workflow.sql	22 May 2001 22:46:13 -0000	1.5
+++ openacs-4/packages/cms/sql/postgresql/cms-workflow.sql	8 Jun 2001 01:44:53 -0000	1.6
@@ -462,7 +462,7 @@
     
 
     if NOT FOUND then
-        raise EXCEPTION ''-20000, ''Bad transition key %'', p_transition_key;
+        raise EXCEPTION ''-20000:  Bad transition key %'', p_transition_key;
     end if;
 
     return v_this_place;
@@ -721,7 +721,7 @@
 
     if v_task_state = ''started'' and v_holding_user != p_user_id then
 
-      raise EXCEPTION '' -20000:content_workflow.approve - Could not approve task because this task is checked out by someone else %'', v_holding_user;
+      raise EXCEPTION '' -20000: content_workflow.approve - Could not approve task because this task is checked out by someone else %'', v_holding_user;
 
     else if v_task_state != ''started'' and v_task_state != ''enabled'' then
       raise EXCEPTION '' -20000: content_workflow.approve - Could not approve task because this task is in an invalid state %'', v_task_state;
