Index: openacs-4/packages/robot-detection/sql/oracle/robot-detection-create.sql
===================================================================
RCS file: /usr/local/cvsroot/openacs-4/packages/robot-detection/sql/oracle/robot-detection-create.sql,v
diff -u -r1.1 -r1.2
--- openacs-4/packages/robot-detection/sql/oracle/robot-detection-create.sql	20 Apr 2001 20:51:22 -0000	1.1
+++ openacs-4/packages/robot-detection/sql/oracle/robot-detection-create.sql	11 Dec 2003 21:40:12 -0000	1.2
@@ -28,5 +28,6 @@
 	-- insertion_date records when this row was actually inserted
 	-- used to determine if we need to re-populate the table from
 	-- the text file at Web Robots DB.
-	insertion_date                  date default sysdate not null
+	insertion_date                  date default sysdate not null,
+	modified_date			date
 );
