Index: openacs-4/packages/imsld/sql/postgresql/imsld-drop.sql
===================================================================
RCS file: /usr/local/cvsroot/openacs-4/packages/imsld/sql/postgresql/imsld-drop.sql,v
diff -u -r1.7 -r1.8
--- openacs-4/packages/imsld/sql/postgresql/imsld-drop.sql	30 Jan 2006 19:31:05 -0000	1.7
+++ openacs-4/packages/imsld/sql/postgresql/imsld-drop.sql	29 Mar 2006 15:55:24 -0000	1.8
@@ -11,6 +11,6 @@
 
 \i imsld-cp-drop.sql
 
-\i imsld-status-drop.sql
+\i imsld-production-delivery-drop.sql
 
 \i imsld-level-b-drop.sql
\ No newline at end of file
