Index: openacs-4/packages/acs-subsite/sql/postgresql/site-node-selection-drop.sql
===================================================================
RCS file: /usr/local/cvsroot/openacs-4/packages/acs-subsite/sql/postgresql/site-node-selection-drop.sql,v
diff -u -N
--- /dev/null	1 Jan 1970 00:00:00 -0000
+++ openacs-4/packages/acs-subsite/sql/postgresql/site-node-selection-drop.sql	13 Jan 2005 13:55:32 -0000	1.2
@@ -0,0 +1,11 @@
+--
+-- packages/acs-kernel/sql/site-node-selection.sql
+--
+-- @author vivian@viaro.net
+-- @creation-date 2004-11-23
+-- @cvs-id site-node-selection.sql
+--
+
+drop table site_nodes_selection;
+
+--show errors
\ No newline at end of file
