--
-- @author Nima Mazloumi (mazloumi@uni-mannheim.de)
-- @creation-date 6 Jan 2004

--
--  Copyright (C) 2004 Nima Mazloumi
--
--  This package is free software; you can redistribute it and/or modify it under the
--  terms of the GNU General Public License as published by the Free Software
--  Foundation; either version 2 of the License, or (at your option) any later
--  version.
--
--  It is distributed in the hope that it will be useful, but WITHOUT ANY
--  WARRANTY; without even the implied warranty of MERCHANTABILITY or FITNESS
--  FOR A PARTICULAR PURPOSE.  See the GNU General Public License for more
--  details.
--

-- IMS Metadata 1.2.1 Compliant
-- http://www.imsglobal.org/metadata/imsmdv1p2p1/imsmd_infov1p2p1.html

DROP function ims_md_general__new (integer,varchar,varchar,varchar,varchar,varchar,varchar);